##### Common options

- `apiUrl` - The url of the openpanel API or your self-hosted instance
- `clientId` - The client id of your application
- `clientSecret` - The client secret of your application (**only required for server-side events**)
- `filter` - A function that will be called before sending an event. If it returns false, the event will not be sent
- `disabled` - If true, the library will not send any events
